Table 1. Log of Spectral Standard Observations

Name Sp. Ty.^a Date Observed Int. Time Telluric Std. (UT) (seconds)

Gl 775 K5V 1996 Jun 05 75 HR 7700 (B3V) Gl 767A M0.5V 1996 Jun 04 124 HR 7436 (A3Vn) Gl 767B M2.5V 1996 Jun 04 60 HR 7436 (A3Vn) Gl 381 M2.5V 1997 Apr 30 170 HR 3906 (A0Vs) Gl 436 M3V 1997 Apr 30 180 HR 3906 (A0Vs) Gl 669A M3.5V 1996 Jun 04 80 HR 6502 (B5V) Gl 402 M4V 1997 Apr 29 182 HR 4378 (A2V) Gl 669B M4.5V 1996 Jun 04 110 HR 6502 (B5V) Gl 406 M6V 1997 Apr 29 170 HR 4378 (A2V) GJ 1111 M6.5V 1997 Apr 29 210 HR 3566 (A2V) Gl 644C M7V 1997 Aug 01 80 HR 6278 (A2IV) Gl 752B M8V 1996 Jun 05 90 HR 7700 (B3V) LHS 2924 M9V 1996 Jun 06 540 HR 5415 (A1V) BRI 0021-0214 ¿M9.5V 1998 Jan 05 540 HR 0051 (B9V)

aSpectral types from Kirkpatrick, Henry, & McCarthy (1991) or Henry, Kirkpatrick, & Simons (1994)